<template>
	<view class="page">
		<u-navbar :title="title" :border-bottom="false" :background="bgc" title-color='#000' title-size='36'
			:title-bold='true' height='45' id="navbar">
		</u-navbar>
		<view class="tit">
			<image src="https://api.ccttiot.com/smartmeter/img/static/ufvwKG3vcJYtbkf0Oeij" mode=""></image>
			除螨设置
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			间隔时长
		</view>
		<view class="set_li">
			每隔<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>天/次 除螨工作
		</view>
		<view class="tit">
			<image src="https://api.ccttiot.com/smartmeter/img/static/ufvwKG3vcJYtbkf0Oeij" mode=""></image>
			保护设置
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			电量保护（%）
		</view>
		<view class="set_li">
			电量少于<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>加热板/风扇停止工作
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			加热（℃）
		</view>
		<view class="set_li">
			箱外温度低于<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>加热板工作
		</view>
		<view class="set_li">
			箱内高于箱外<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>加热板停止工作
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			风扇（℃）
		</view>
		<view class="set_li">
			箱内温度高于<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>风扇工作
		</view>
		<view class="set_li">
			箱内温度降到<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>风扇停止工作
		</view>
		<view class="set_li">
			CO₂浓度高于<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>风扇工作
		</view>
		<view class="set_li">
			CO₂浓度低于<view class="ipt_box"><input type="text" class="ips" v-model="code" placeholder=" " 
				placeholder-class="my-placeholder" /> </view>风扇停止工作
		</view>
		<view class="tit">
			<image src="https://api.ccttiot.com/smartmeter/img/static/ufvwKG3vcJYtbkf0Oeij" mode=""></image>
			震动通知
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			单次震动
		</view>
		<view class="tit1">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utZh1saVjZgOBz3orDkL" mode=""></image>
			持续震动
			
		</view>
		<view class="btn_box">
			<view class="btns">
				重置
			</view>
			<view class="btn1">
				保存
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				bgc: {
					backgroundColor: " #F4FAF8",
				},
				title: "设置",
				code:''

			}
		},
		onLoad() {

		},
		onShow() {

		},
		methods: {


		}
	}
</script>

<style lang="scss">
	page {
		background-color: #F4FAF8;
	}

	.page {
		// position: relative;
		width: 750rpx;
		padding: 40rpx;
		.btn_box{
			margin-top: 136rpx;
			display: flex;
			flex-wrap: nowrap;
			align-items: center;
			.btns{
				display: flex;
				align-items: center;
				justify-content: center;
				width: 322rpx;
				height: 88rpx;
				background: #FFF5D6;
				border-radius: 20rpx 20rpx 20rpx 20rpx;
				border: 2rpx solid #FFC107;
				
				font-weight: 500;
				font-size: 32rpx;
				color: #FFC107;
			}
			.btn1{
				display: flex;
				align-items: center;
				justify-content: center;
				margin-left: 30rpx;
				width: 322rpx;
				height: 88rpx;
				background: #FFCC25;
				border-radius: 20rpx 20rpx 20rpx 20rpx;
				
				font-weight: 500;
				font-size: 32rpx;
				color: #3D3D3D;
			}
		}
		.tit {
			display: flex;
			flex-wrap: nowrap;
			align-items: center;

			image {
				margin-right: 22rpx;
				width: 52rpx;
				height: 52rpx;

			}

			font-weight: 600;
			font-size: 36rpx;
			color: #3D3D3D;
		}

		.tit1 {
			margin-top: 32rpx;
			display: flex;
			flex-wrap: nowrap;
			align-items: center;

			image {
				margin-right: 18rpx;
				width: 46rpx;
				height: 46rpx;

			}

			font-weight: 400;
			font-size: 32rpx;
			color: #3D3D3D;
		}

		.set_li {
			margin-top: 34rpx;
			margin-left: 104rpx;
			display: flex;
			flex-wrap: nowrap;
			align-items: center;
			font-weight: 400;
			font-size: 32rpx;
			color: #808080;

			.ipt_box {
				display: flex;
				align-items: center;
				justify-content: center;
				margin: 0 16rpx;
				// width: 98rpx;
				height: 88rpx;
				background: #FFFFFF;
				box-shadow: 0rpx 0rpx 8rpx 0rpx rgba(0, 0, 0, 0.15);
				border-radius: 20rpx 20rpx 20rpx 20rpx;
				.ips {
					margin-left: 15rpx;
					width: 100rpx;
						
				}
						
				
						
				.my-placeholder {
					font-weight: 400;
					font-size: 32rpx;
					color: #808080;
				}

			}
			

		}

	}
</style>