<template>
	<view class="page">
		<u-navbar :title="title" :border-bottom="false" :background="bgc" title-color='#000' title-size='36'
			:title-bold='true' height='45' id="navbar">
		</u-navbar>
	
		
		<view class="tit">
			蜂箱温度预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
			蜂箱湿度预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
			蜂箱重量预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
			蜂箱进出量预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
		蜂箱电量预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
		蜂箱频率预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>
		<view class="tit">
		电子围栏范围预警
			<u-switch v-model="checked"></u-switch>
		</view>
		<view class="iptbox" >
			<input type="text" class="ips" v-model="form.address" placeholder="请选择蜂场具体位置" placeholder-class="my-placeholder"
				disabled />
			<image src="https://api.ccttiot.com/smartmeter/img/static/ugAdKZm5ZHZ4to1cDsNI" mode=""></image>
		</view>

	</view>
</template>

<script>
	export default {
		data() {
			return {
				bgc: {
					backgroundColor: " #F4FAF8",
				},
				title: "添加视频监控",
				checked:false

			}
		},
		onLoad() {

		},
		onShow() {

		},
		methods: {
			
		}
	}
</script>

<style lang="scss">
	page {
		background-color: #F4FAF8;
	}

	.page {
		// position: relative;
		padding-bottom: 200rpx;
		width: 750rpx;
		.tit {
			margin-right: 49rpx;
			display: flex;
			flex-wrap: nowrap;
			align-items: center;
			justify-content: space-between;
			margin-top: 40rpx;
			margin-left: 50rpx;
			font-weight: 600;
			font-size: 32rpx;
			color: #3D3D3D;
		}
		.iptbox {
			display: flex;
			align-items: center;
			flex-wrap: nowrap;
			padding: 22rpx;
			margin: 28rpx auto 0;
			width: 658rpx;
			height: 88rpx;
			background: #FFFFFF;
			box-shadow: 0rpx 0rpx 8rpx 0rpx rgba(0, 0, 0, 0.15);
			border-radius: 20rpx 20rpx 20rpx 20rpx;
		
			.ips {
				width: 630rpx;
		
			}
		
			image {
				width: 18rpx;
				height: 32rpx;
			}
		
			.my-placeholder {
				font-weight: 400;
				font-size: 32rpx;
				color: #808080;
			}
		}



	}
</style>